-3 -2 -1 0 1 2 3 0 5 10 15 20 25 30 35 40 Nent = 1202 Mean = 1.26e-05 RMS = 1 Under = 0 Over = 0 Chi2 / ndf = 78.19 / 81 Prob = 0.5678 1.095 ± Constant = 27.41 0.03089 ± Mean = -0.02299 0.02869 ± Sigma = 0.9925

After final iter cut σ Final iter and 2.5

Residual/Err After Cuts_{Nent = 1202}

± ± ±

Residual at L2 (microns)

-60 -40 -20 0 20 40 60 0

5

10

15

20

25

30 Nent = 1242 Mean = -1.146 RMS = 24.43 Under = 4 Over = 10

Residual Full Sample Nent = 1242