-3 -2 -1 0 1 2 3 0

5

10

15

20

25

30

s Nent = 1005 Mean = 4.406e-06 RMS = 1 Under = 0 Over = 0 Integ = 1005 Chi2 / ndf = 80.17 / 80 Prob = 0.4788 0.9339 ± Constant = 23.77 0.03252 ± Mean = 0.0005847 0.02451 ± Sigma = 1.015

Residual/Err_s

± ± ±