htemp Entries 628702 Mean 0.005677 RMS 3.753

Signed Pt of SVX tracks in SecVtxModule (GeV)

-20 -15 -10 -5 0 5 10 15 20 d0 (cm)

-0.001

-0.0005

0

0.0005

0.001 svxd0:svxpt {abs(svxd0)<0.02&&abs(svxpt)<20}