Global Iteration of Fit

0 1 2 3 4 5 6 7 8 9

Width of Pull Distribution

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 1.25 1.3 15 GeV Cut 16 GeV Cut 17 GeV Cut 18 GeV Cut 19 GeV Cut

Check of Fit for 1-Strip Clusters vs Global Iteration