80 100 120 140 160 180 200 220 240 260 280

)^2 Events/(10 GeV/c

0 0.5 1 1.5 2 2.5 3_{Data (11 evts)}

Signal + Bkgd

Bkgd only

)^{-1}

CDF Run II Preliminary (~56 pb = 182.0 +12.3 / -9.9 (stat.) top M

160 165 170 175 180 185 190

Ln(L) Δ-

0 0.5 1 1.5 2 2.5

)^2

Top Mass (GeV/c

)^2

Reconstructed Top Mass, Tagged Events (GeV/c