Bill Orejudos

Signature

Escapes detector, evades bounds from existing searches

Slow moving, high transverse momentum (P_T)

Large ionization (dE/dx) energy loss

Isolated

Penetrating (will look like muon)

Large Time-of-Flight (TOF)

Can perform very general searches independent of the reason CHAMP is massive, charged, long-lived

CHAMP

Time-of-Flight (TOF) detector

Muon Detector

Tracking Chamber