Entries 369 / ndf

2χ 4.781 / 17 Constant 2.359±

35.96 Mean 0.9086 ± -0.1667 Sigma 0.7225 ± 16.42

microns

-60 -40 -20 0 20 40 60 events per 4 microns

0 5 10 15 20 25 30 35 40 45 50

± ±

Residual at L0 (best ladder)