mass (GeV) ππK 1.4 1.5 1.6 1.7 1.8 1.9 2 0 100 200 300 400 500 600 700 800 900 ππ ->K + mass in D

+D_{hdmK2Pi}

Entries 145246 Mean 1.666 RMS 0.1681

+ +D