X (cm)

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6

Y (cm)

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 1.2

I.P

= 4.1 mm xyL

= 6.2 mm xyL

Jet4 36.5 GeV

Jet3 57.8 GeV

MET 40.2 GeV

Muon 50.5 GeV

Jet1 102 GeV

Jet2 69.7 GeV

CDF II Preliminary =179.5+-9.3 GeV

event top m