sieff_good

Entries 11 Mean 3.61 RMS 1.434 Underflow 0 Overflow 0

Muon Pt (GeV)

2 3 4 5 6 7 8

Silicon Efficiency

0.8

0.82

0.84

0.86

0.88

0.9 Silicon Efficiency