DELPHI Ρ S = 189 GeV Preliminary

0

2

4

6

8

10

12

0 20 40 60 80 100 120

m_h (GeV/c^2)

Events/4 GeV/c^2

data 158 pb^{-1} hqq hνν ττqq hee,hμμ hZ MC (95 GeV/c^2)