1

10

50 100 150 200 250

m_A (GeV/c^2) tan β

1

DELPHI Preliminary ΡS = 130 5 189 GeV

m_{top} = 173.9 GeV/c^2 M_{susy} = 1 TeV/c^2

Excluded with Maximal mixing Excluded with No mixing