OPAL preliminary

likelihood events/0.0667

Cut

4-fermion 2-fermion Signal (m_H=95 GeV)

OPAL data

10^{-1}

1

10

10^2

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1