OPAL 189 GeV preliminary

cut OPAL data 2-fermion 4-fermion hA-signal (arb.scale)

Ah-Likelihood

Events/0.05

(b)

1

10

10^2

10^3

0 0.2 0.4 0.6 0.8 1