OPAL PRELIMINARY

Ρs = 183 - 189 GeV

OPAL data background HZ-Signal (m_H=95 GeV) HZ-Signal (m_H=91 GeV)

m_H^{rec} ΜGeVΝ

Events/3 GeV

0 2 4 6 8 10 12 14 16 18 20

0 20 40 60 80 100 120