Z(cm)

-100 -80 -60 -40 -20 0 20 40 60 80 100

Signed Radius(cm)

0

10

20

30

40

50 DATA

Z(cm)

-100 -80 -60 -40 -20 0 20 40 60 80 100

Signed R(cm)

0

10

20

30

40

50 MCMC