D02 Entries 8559 Mean 5.065e-05 RMS 0.02283 Underflow 791 Overflow 799 Integral 6969

Impact Parameter in SVT (cm)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 0 50 100 150 200 250 300 350

2nd Highest D0 of bbA 90 GeV at L2 D02_cut

Entries 2271 Mean 0.0004462 RMS 0.02749 Underflow 188 Overflow 205 Integral 1878