Pt1 Entries 8559 Mean 3.787 RMS 2.565 Underflow 0 Overflow 433 Integral 8126

Pt in SVT (GeV)

0 2 4 6 8 10 12 14 0

200

400

600

800

1000

Pt of Highest D0 of bbA 90 GeV at L2 Pt1_cut

Entries 2271 Mean 4.611 RMS 2.61 Underflow 0 Overflow 141 Integral 2130