Et Entries 49966 Mean 70.66 RMS 32.73 Underflow 0 Overflow 26 Integral 4.994e+04

SumEt at L1 (GeV)

0 50 100 150 200 250 300 0 500 1000

1500

2000

2500

3000

3500

4000

4500

SumEt of 90 GeV bbA at L1 Et_cut

Entries 10507 Mean 118.3 RMS 32.61 Underflow 0 Overflow 26 Integral 1.048e+04