Et Entries 2271 Mean 182.6 RMS 39.75 Underflow 0 Overflow 0 Integral 2271

Sum Et at L3 (GeV)

0 50 100 150 200 250 300 350 400 450 500 0 50 100 150 200 250 300 350 SumEt at L3 for bbA 90 GeV Et_cut

Entries 2048 Mean 184.8 RMS 40.73 Underflow 0 Overflow 0 Integral 2048