HSC vs SHW at 115 GeV

50 16.5 22 42 bkgd 0.78

0.86

0.98

0.57

S/÷B

25.1 8.1 - - QCD 3.3 2.6 1.4 1.6 WZ/ZZ

13.8 2.9 7.7 20.9

Wbb/Zbb 5.0 1.0 5.3 6.9 tqb/tb 3.0 1.9 7.8 12.3 tt 5.5 3.5 4.6 3.7 signal SHW HSC SHW HSC ZH (nnbb)

WH (lnbb)

mass window: 100-130 GeV