1

10

0 100 200 300 400 500

1

LEP 88-209 GeV Preliminary

m_{A°} (GeV/c^2) tanβ

Excluded by LEP m_{h°}-max

M_{SUSY}=1 TeV M_2=200 GeV μ=-200 GeV m_{gluino}=800 GeV Stop mix: X_t=2M_{SUSY}