0 20 40 60 80 100 120 140

0 20 40 60 80 100 120 140 0

160 LEP 88-209 GeV Preliminary

m_{h°} (GeV/c^2) m_{A°} (GeV/c^2)

Excluded by LEP

Theoretically Inaccessible m_{h°}-max