Fitted PEM x (3x3) - PES x (best match)

-10 -8 -6 -4 -2 0 2 4 6 8 10 0 10 20 30 40 50 60 70 Nent = 441 Mean = 0.03589 RMS = 1.077 Under = 1 Over = 1

X diff 3x3 - PES Nent = 441 _{Mean = 0.03589}