X from PEM 3x3 Chisq - PES 2d X (cm)

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

5

10

15

20

25

30 Nent = 269 Mean = 0.09929 RMS = 1.104 Under = 0 Over = 0

X diff 3x3 - PES Nent = 269

Y from PEM 3x3 Chisq - PES 2d Y (cm)

-10 -8 -6 -4 -2 0 2 4 6 8 10 0 5 10 15 20 25 30 Nent = 269 Mean = 0.03732 RMS = 1.091 Under = 0 Over = 0

Y diff 3x3 - PES Nent = 269