0 20 40 60 80 100 120 140 160

1.48 1.5 1.52 1.54 1.56 1.58 1.6 1.62 1.64 1.66 1.68

0.22

0.24

0.26

0.28 0.3 0.32

0.34

0.36

0.38 0.4 0.42

0.44

Strip Hit Position histo1

Nent = 99077 Mean x = 1.579 Mean y = 0.3369 RMS x = 0.0462 RMS y = 0.04783 0 0 0 0 99077 0 0 0 0

0

1000

2000

3000

4000

5000

6000

1.48 1.5 1.52 1.54 1.56 1.58 1.6 1.62 1.64 1.66 1.68

0.22

0.24

0.26

0.28 0.3 0.32

0.34

0.36

0.38 0.4 0.42

0.44

Strip Hit Position weighted with Electron Energy histo2

Nent = 99077 Mean x = 1.579 Mean y = 0.337 RMS x = 0.04604 RMS y = 0.04773 0 0 0 0 3854959 0 0 0 0

33 34 35 36 37 38 39 40 41

1.48 1.5 1.52 1.54 1.56 1.58 1.6 1.62 1.64 1.66 1.68

0.22

0.24

0.26

0.28 0.3 0.32

0.34

0.36

0.38 0.4 0.42

0.44

Strip Hit Position weighted with Electron Energy histoDiv

Nent = 1764 Mean x = 1.58 Mean y = 0.3366 RMS x = 0.04903 RMS y = 0.04982 0 0 0 0 39870 0 0 0 0

0.86

0.88 0.9 0.92

0.94

0.96

0.98 1 1.02

1.48 1.5 1.52 1.54 1.56 1.58 1.6 1.62 1.64 1.66 1.68

0.22

0.24

0.26

0.28 0.3 0.32

0.34

0.36

0.38 0.4 0.42

0.44

Relative Face Response histoNorm

Nent = 1764 Mean x = 1.58 Mean y = 0.3366 RMS x = 0.04903 RMS y = 0.04982 0 0 0 0 996 0 0 0 0