-5 -4 -3 -2 -1 0 1 2 3 4 5 0

1

2

3

4

5

dxcent Nent = 97 Mean = 1.223 RMS = 2.536 Under = 13 Over = 19

x (central elecs)

Δ_{dxcent}

-5 -4 -3 -2 -1 0 1 2 3 4 5 0

2

4

6

8

10

12

dzcent Nent = 97 Mean = 0.5024 RMS = 1.448 Under = 5 Over = 9

z (central elecs)

Δ_{dzcent}