3 3.5 4 4.5 5 5.5 6 6.5 7 7.5 8 0 20 40 60 80 100 120 140 htemp Nent = 168 Mean = 5.19 RMS = 0.4358 Under = 0 Over = 0

Elec.maxtrk.nsilayers() {Elec.maxtrk.pt!=0&&Elec.emc.emet>10} htemp