(cm) 0d -0.2 -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 max. residual (cm)

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

Stub quality variables

0 1 2 3 4 5 0 100 200 300 400 500 600 700 800 900 Stub type All stubs ‘‘Good’’ stubs

Number of stubs found

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 5 10 15 20 25 30 35 40 45 by Region_{exp}ϕΔ/ϕΔ West Plug East Plug Central

expϕΔ/ϕΔ η -4 -3 -2 -1 0 1 2 3 4 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

η Stub finding efficiency vs.