Histo-Scope Histogram Fill Styles (1 of 2)

none (0)

-2 0 2 0

50

X

Y solid (1)

-2 0 2 0

50

X

Y fineHoriz (2)

-2 0 2 0

50

X

Y coarseHoriz (3)

-2 0 2 0

50

X

Y

fineVert (4)

-2 0 2 0

50

X

Y coarseVert (5)

-2 0 2 0

50

X

Y fineGrid (6)

-2 0 2 0

50

X

Y coarseGrid (7)

-2 0 2 0

50

X

Y

fineX (8)

-2 0 2 0

50

X

Y coarseX (9)

-2 0 2 0

50

X

Y fine45deg (10)

-2 0 2 0

50

X

Y med45deg (11)

-2 0 2 0

50

X

Y

coarse45deg (12)

-2 0 2 0

50

X

Y fine30deg (13)

-2 0 2 0

50

X

Y coarse30deg (14)

-2 0 2 0

50

X

Y fine60deg (15)

-2 0 2 0

50

X

Y

coarse60deg (16)

-2 0 2 0

50

X

Y rFine45deg (17)

-2 0 2 0

50

X

Y rMed45deg (18)

-2 0 2 0

50

X

Y rCoarse45deg (19)

-2 0 2 0

50

X

Y