                                                              ^On wafer~ SVX3D  yields

4-in

                        Honeywell
                                                                                batches  ( 118 wafers probed ):

Dice probed:

                                                                                                    6114  ( 100 %  )

Good dice:   3091  ( 50.6 % )

Good + Fair dice:  3799  ( 62.1 % )

6-in  lot  8  ( 18 wafers probed ):

                              Including / Excluding  scratched dice

Dice probed:

                                                                                                    2520 / 2026  ( 100  / 100  % )

Good dice:   1067             ( 42.3 / 52.7 % )

Good + Fair dice:  1330             ( 52.8 / 65.6 % )

6-in

                        lots  9  and  12
                                                                                                    (

                                                                                                              33
 wafers probed ):

Dice probed:

                                                                                                    4422  ( 100 %  )

Good dice:   1758  ( 39.7 % )

Good + Fair dice:  2357  ( 53.3 % )

The wafer quality maps are on the WWW at

                                                            http://cdfsg6.lbl.gov/~igv/svxmaps.html