FILE: $RCSfile: fanin.sch,v $ REVISION: $Revision: 1.5 $

DRAWN BY:

PAGE OF

TITLE A

B

C

D

E

F

G

H

1 2 3 4 5 6 7 8 9 10 11 12

A

B

C

D

E

F

G

H

1 2 3 4 5 6 7 8 9 10 11 12 I I

15 O1+ 16 O1-

14 O2+ 13 O2-

11 O3+ 12 O3-

10 O4+ 9 O4-

2 I1 3 I2 6 I3 7 I4 1 EN 8 EN*

4 vcc U9 DS90LV047A

2 I1+ 1 I1-

3 I2+ 4 I2-

6 I3+ 5 I3-

7 I4+ 8 I4-

15 O1 14 O2 11 O3 10 O4 16 EN

9 EN*

13 vcc U10 DS90LV048A

+3.3V

+3.3V

C? uF

+3.3V

C? uF

R? 100 Ohm

R? 100 Ohm

+3.3V

Do0

Do1

Do0+

Do0-

Do1+

Do1-

Clock

Di

Clock+

Clock- Di+

Di-