p/GeV

0 5 10 15 20 25 0 0.2 0.4 0.6 0.8 1 1.2 E/p (sig,bck), wall

gjtc0d 5.3.3_nt (1087892) FAKEEV 5.3.3_nt (2090929) EM

p/GeV

0 5 10 15 20 25 0 0.2 0.4 0.6 0.8 1 1.2 HAD

p/GeV

0 5 10 15 20 25 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 TOT

p/GeV

0 5 10 15 20 25 0 0.2 0.4 0.6 0.8 1 1.2 E/p (cor), wall

gjtc0d 5.3.3_nt (1087892) FAKEEV 5.3.3_nt (2090929)

p/GeV

0 5 10 15 20 25 0 0.2 0.4 0.6 0.8 1 1.2

p/GeV

0 5 10 15 20 25 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

p/GeV

0 5 10 15 20 25

-0.2

-0.15

-0.1

-0.05 -0 0.05 0.1 0.15 0.2 (MC-data)/data

0.003 ± +0.031

p/GeV

0 5 10 15 20 25

-0.2

-0.15

-0.1

-0.05 -0 0.05 0.1 0.15 0.2 0.003 ± -0.027

p/GeV

0 5 10 15 20 25

-0.2

-0.15

-0.1

-0.05 -0 0.05 0.1 0.15 0.2 0.002 ± +0.001