p/GeV

0 5 10 15 20 25 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 E/p (sig,bck), tower 10

gjtc0d 5.3.3_nt (259636) pydj000 5.3.3_nt (311234) EM

p/GeV

0 5 10 15 20 25 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 HAD

p/GeV

0 5 10 15 20 25 0 0.2 0.4 0.6 0.8 1 TOT

p/GeV

0 5 10 15 20 25 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 E/p (cor), tower 10

gjtc0d 5.3.3_nt (259636) pydj000 5.3.3_nt (311234)

p/GeV

0 5 10 15 20 25 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

p/GeV

0 5 10 15 20 25 0 0.2 0.4 0.6 0.8 1

p/GeV

0 5 10 15 20 25

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 (MC-data)/data

0.004 ± -0.095

p/GeV

0 5 10 15 20 25

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.009 ± -0.014

p/GeV

0 5 10 15 20 25

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.004 ± -0.058