ϕ -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 E/p (cor), central, 0-2 GeV/c EM comb (2695130) fake_f4 (168250)

ϕ -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 HAD

ϕ -1 -0.8-0.6-0.4-0.2 0 0.2 0.4 0.6 0.8 1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 TOT