p/GeV

10 20 30 40 50 60

FEDP

0.4

0.5

0.6

0.7

0.8

0.9

1

p1: 0.568+0.328*tanh(0.550*(ln(p)-0.506) p0: 0.721+0.185*tanh(0.567*(ln(p)-1.677) scale: 0.8