p/GeV

0 2 4 6 8 10 12 14 16 18 20 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 E/p 7x7 (cor), tower 10 EM data (av) (5919838) fake_q7a1 (78495)

p/GeV

0 2 4 6 8 10 12 14 16 18 20 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 HAD

p/GeV

0 2 4 6 8 10 12 14 16 18 20 0 0.2

0.4 0.6 0.8

1 1.2 TOT

p/GeV

0 2 4 6 8 10 12 14 16 18 20 0 0.2

0.4 0.6 0.8

1 1.2 MIP