Jet Energy Scale Constraint

0 0.05 0.1 0.15 0.2 0.25 0.3

)^2 Expected Statistical Errors ( GeV/c

4 6 8 10

12 14

-1 CDF Run II preliminary, 162 pb

Mt / minMijNM Mt / HtMom Mt / Pt4J Mt