Good permutation, M = 150

100 200 300 100 200 300 400

Good permutation, M = 200

100 200 300 100 200 300 400

Non-W Background

100 200 300 100 200 300 400

Bad permutation, M = 150

100 200 300 100 200 300 400

Bad permutation, M = 200

100 200 300 100 200 300 400

W4q Background

100 200 300 100 200 300 400

Incorrect jets, M = 150

100 200 300 100 200 300 400

Incorrect jets, M = 200

100 200 300 100 200 300 400

Wbb2q Background

100 200 300 100 200 300 400

Scalar Sum of the Four Leading Jets Pt (GeV/c)

Reconstructed Mass (GeV/c )^2