95% Limit/SM

0 10 20 30 40 50 60 70

Likelihood

0 0.02

0.04

0.06

0.08

0.1_2

= 110 GeV/c Hm 95% CL= 14.2 pb

CDF II Preliminary

95% Limit/SM

0 10 20 30 40 50 60 70

Likelihood

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09 2

= 115 GeV/c Hm 95% CL= 15.2 pb

CDF II Preliminary

95% Limit/SM

0 10 20 30 40 50 60

Likelihood

0 0.02

0.04

0.06

0.08

0.1^2

= 120 GeV/c Hm 95% CL= 13.8 pb

CDF II Preliminary

95% Limit/SM

0 10 20 30 40 50 60

Likelihood

0 0.02

0.04

0.06

0.08

0.1^2

= 130 GeV/c Hm 95% CL= 13.2 pb

CDF II Preliminary