)^2

(GeV/c Hm 100 110 120 130 140 150 160 170 180 190 200

LLR

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 σ 2- B LLR σ 1- B LLR B LLR S+B LLR OBS LLR

Tevatron Run II Preliminary -1 Ldt=0.3-1.0 fb ∫