ZH->llbb 95% Limit/SM

0 10 20 30 40 50 60 70

Likelihood

0 0.01

0.02

0.03

0.04

0.05

0.06 2

= 110 GeV/c Hm 95% CL= 24.8 pb CDF Run II Preliminary

ZH->llbb 95% Limit/SM

0 10 20 30 40 50 60 70 80

Likelihood

0 0.01

0.02

0.03

0.04

0.05

0.06_2

= 115 GeV/c Hm 95% CL= 27.2 pb CDF Run II Preliminary

ZH->llbb 95% Limit/SM

0 10 20 30 40 50 60 70 80 90

Likelihood

0 0.01

0.02

0.03

0.04

0.05 2 = 120 GeV/c Hm 95% CL= 32.8 pb CDF Run II Preliminary

ZH->llbb 95% Limit/SM

0 20 40 60 80 100 120 140

Likelihood

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035 2 = 130 GeV/c Hm 95% CL= 48.2 pb CDF Run II Preliminary