95% Limit/SM

0 20 40 60 80 100

Likelihood

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08 2 = 150 GeV/c Hm

95% CL= 12.8 pb

95% Limit/SM

0 20 40 60 80 100

Likelihood

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07 2

= 160 GeV/c Hm

95% CL= 11.8 pb

95% Limit/SM

0 20 40 60 80 100

Likelihood

0 0.01

0.02

0.03

0.04

0.05

0.06^2

= 170 GeV/c Hm

95% CL= 13.2 pb

95% Limit/SM

0 20 40 60 80 100

Likelihood

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035 2

= 180 GeV/c Hm

95% CL= 20.2 pb

95% Limit/SM

0 20 40 60 80 100

Likelihood

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016_2

= 190 GeV/c Hm

95% CL= 43.8 pb

95% Limit/SM

0 20 40 60 80 100

Likelihood

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

0.022 2 = 200 GeV/c Hm

95% CL= 35.2 pb