)^2

Higgs mass (GeV/c

110 115 120 125 130 135 140 145 150

Acceptance(%)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 ST + ST ST + JP

)^{-1}

CDF Run II Preliminary (1.9 fb