hlepidmc_ISOTKh Entries 18050 Mean 1.319 RMS 0.6993 Underflow 0 Overflow 0

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

hlepidmc_ISOTKh